\section{Results}
\label{results}

\begin{subfigs}{grasp_results}{Results of the grasp task performance metrics for each vibrotactile positioning.}[
    Geometric means with bootstrap \percent{95} confidence and Tukey's \HSD pairwise comparisons: *** is \pinf{0.001}, ** is \pinf{0.01}, and * is \pinf{0.05}.
  ][
  \item Time to complete a trial.
  \item Number of contacts with the cube.
  \item Time spent on each contact.
  \item Distance between thumb and the other fingertips when grasping.
  ]
  \subfig[0.24]{results/Grasp-CompletionTime-Location-Overall-Means}
  \subfig[0.24]{results/Grasp-Contacts-Location-Overall-Means}
  \subfig[0.24]{results/Grasp-TimePerContact-Location-Overall-Means}
  \subfig[0.24]{results/Grasp-GripAperture-Location-Overall-Means}
\end{subfigs}

Results were analyzed similarly as for the first experiment (\secref{results}).
The \LMM were fitted with the order of the five vibrotactile positionings (\factor{Order}), the vibrotactile positionings (\factor{Positioning}), the visual hand rendering (\factor{Hand}), the {contact vibration techniques} (\factor{Vibration Technique}), and the target volume position (\factor{Target}), and their interactions as fixed effects and Participant as random intercept.

