\chapter{Conclusion}
\mainlabel{conclusion}

% systematic exploration of the parameter space of the haptic rendering to determine the most important parameters their influence on the perception
% measure the difference in sensitivity to the haptic feedback and how much it affects the perception of the object properties
% design, implement and validate procedures to automatically calibrate the haptic feedback to the user's perception in accordance to what it has been designed to represent
% + let user free to easily adjust (eg can't let adjust whole spectrum of vibrotactile, reduce to two or three dimensions with sliders using MDS)
